Pedestals Calib 8596.1

0

50

100

300 350 Hut 1.4.3

HI gain 281.3 LO gain 357.8

0

50

100

300 350 400 Hut 1.4.4

HI gain 348.5 LO gain 389.6

0 50 100

400 450 500 Hut 1.4.5

HI gain 458.3 LO gain 415.4

0 50 100

300 350 400 Hut 1.4.6

HI gain 370.4 LO gain 334.8

0 50 100

300 350 400 Hut 1.4.7

HI gain 381.9 LO gain 342.2

0

50

100

350 400 450 Hut 1.4.8

HI gain 387.9 LO gain 426.8

0

50

100

300 350 400 Hut 1.5.2

HI gain 363.7 LO gain 329.2

0 50 100

300 350 400 Hut 1.5.3

HI gain 311.6 LO gain 363.6

0 50 100

400 450 500 Hut 1.5.4

HI gain 452.5 LO gain 460.6

0

50

100

300 350 400 450 Hut 1.5.5

HI gain 383.8 LO gain 365.6

Pedestals Calib 8596.1

0

50

100

350 400 450 Hut 1.5.6

HI gain 433.6 LO gain 397.8

0

50

100

300 350 400 Hut 1.5.7

HI gain 301.3 LO gain 380.1

0

50

100

350 400 450 Hut 1.5.8

HI gain 418.3 LO gain 429.9

0

50

100

350 400 450 Hut 1.6.2

HI gain 327.6 LO gain 467.8

0

50

100

350 400 450 Hut 1.6.3

HI gain 371.8 LO gain 396.2

0

50

100

350 400 450 Hut 1.6.4

HI gain 430.5 LO gain 382.2

0

50

100

400 450 500 Hut 1.6.5

HI gain 477.3 LO gain 442.2

0

50

100

350 400 450 Hut 1.6.6

HI gain 394.3 LO gain 369.7

0

50

350 400 450 Hut 1.6.7

HI gain 443.7 LO gain 376.3

0 50 100

300 350 Hut 1.6.8

HI gain 311.8 LO gain 325.6

Pedestals Calib 8596.1

0

100

350 400 450 Hut 1.7.2

HI gain 391.4 LO gain 365.8

0

100

350 400 450 Hut 1.7.3

HI gain 403.8 LO gain 390.4

0

100

400 450 500 Hut 1.7.4

HI gain 390.8 LO gain 460.3

0

100

200

400 450 500 Hut 1.7.5

HI gain 451.0 LO gain 454.2

0

100

350 400 450 Hut 1.7.6

HI gain 438.7 LO gain 339.1

0 50 100

350 400 450 Hut 1.7.7

HI gain 394.8 LO gain 376.0

0 50 100

260 280 300 320 340 Hut 1.7.8

HI gain 283.1 LO gain 255.3

0

100

300 350 Hut 1.8.2

HI gain 314.2 LO gain 292.6

0

100

300 350 400 Hut 1.8.3

HI gain 387.8 LO gain 331.7

0

100

300 350 400 Hut 1.8.4

HI gain 386.5 LO gain 350.6

Pedestals Calib 8596.1

0 50 100

350 400 450 Hut 1.8.5

HI gain 394.9 LO gain 387.8

0

100

400 450 500 Hut 1.8.6

HI gain 423.9 LO gain 484.6

0 50 100

400 450 500 Hut 1.8.7

HI gain 401.6 LO gain 456.6

0

50

252 254 256 Hut 1.8.8

HI gain 364.0 LO gain 0.0

0

50

255 260 265 Hut 1.9.2

HI gain 386.5 LO gain 0.0

0 50 100

300 350 Hut 1.9.3

HI gain 371.7 LO gain 261.6

0 50 100

300 350 400 Hut 1.9.4

HI gain 399.2 LO gain 287.9

0

50

100

400 450 500 Hut 1.9.5

HI gain 455.4 LO gain 413.2

0

50

100

350 400 450 Hut 1.9.6

HI gain 435.5 LO gain 318.8

0 50 100

350 400 450 Hut 1.9.7

HI gain 412.1 LO gain 357.7

Pedestals Calib 8596.1

0

50

100

300 350 400 Hut 1.9.8

HI gain 401.4 LO gain 312.3

0 25 50

300 350 Hut 1.10.2

HI gain 363.1 LO gain 276.2

0

50

450 500 550 Hut 1.10.3

HI gain 531.9 LO gain 419.4

0

50

100

350 400 450 Hut 1.10.4

HI gain 414.3 LO gain 406.3

0

50

100

350 400 450 Hut 1.10.5

HI gain 445.8 LO gain 353.2

0

50

100

400 450 500 Hut 1.10.6

HI gain 461.9 LO gain 426.1

0

50

100

350 400 450

Hut 1.10.7

HI gain 473.7 LO gain 339.0

0

50

100

350 400 450 Hut 1.10.8

HI gain 379.6 LO gain 396.5

0

50

350 400 450 Hut 1.11.3

HI gain 401.8 LO gain 372.6

0 25 50

300 350 Hut 1.11.4

HI gain 334.5 LO gain 305.3

Pedestals Calib 8596.1

0

50

300 350 400

Hut 1.11.5

HI gain 337.1 LO gain 367.6

0

50

100

300 350 400 Hut 1.11.6

HI gain 338.2 LO gain 345.4

0

50

100

350 400 450 Hut 1.11.7

HI gain 379.3 LO gain 404.0

0

50

350 400 450 Hut 1.11.8

HI gain 417.5 LO gain 386.9

LP calibrations Calib 8596.1

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2593. 3.545

Hut 1.4.3 TDC counts

Events

0

50

100

2550 2600 2650

Entries Mean RMS 800 2593. 3.545

Hut 1.4.3

Hut 1.4.3 TDC counts

Events

HImean = 718.7 LOmean = 683.3

0 50 100 150

0 1000 2000 3000 4000

Entries Mean RMS 800 2490. 2.531

Hut 1.4.4 TDC counts

Events

0 50 100 150

2450 2500 2550

Entries Mean RMS 800 2490. 2.531

Hut 1.4.4

Hut 1.4.4 TDC counts

Events

HImean = 771.7 LOmean = 664.6

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 1.4.5 TDC counts

Events

0

500

0 25 50 75 100

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 1.4.5

Hut 1.4.5 TDC counts

Events

HImean = 595.3 LOmean = 496.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2470. 2.320

Hut 1.4.6 TDC counts

Events

0

100

2450 2500 2550

Entries Mean RMS 800 2470. 2.320

Hut 1.4.6

Hut 1.4.6 TDC counts

Events

HImean = 888.3 LOmean = 597.1

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 1.4.7 TDC counts

Events

0

500

0 25 50 75 100

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 1.4.7

Hut 1.4.7 TDC counts

Events

HImean = 380.5 LOmean = 346.2

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2566. 2.057

Hut 1.4.8 TDC counts

Events

0

100

2550 2600 2650

Entries Mean RMS 800 2566. 2.057

Hut 1.4.8

Hut 1.4.8 TDC counts

Events

HImean = 1495.7 LOmean = 1241.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2540. 2.345

Hut 1.5.2 TDC counts

Events

0

100

2500 2550 2600

Entries Mean RMS 800 2540. 2.345

Hut 1.5.2

Hut 1.5.2 TDC counts

Events

HImean = 1033.5 LOmean = 864.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2544. 2.416

Hut 1.5.3 TDC counts

Events

0

100

2500 2550 2600

Entries Mean RMS 800 2544. 2.416

Hut 1.5.3

Hut 1.5.3 TDC counts

Events

HImean = 1055.0 LOmean = 728.4

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2487. 2.142

Hut 1.5.4 TDC counts

Events

0

100

200

2450 2500 2550

Entries Mean RMS 800 2487. 2.142

Hut 1.5.4

Hut 1.5.4 TDC counts

Events

HImean = 1285.4 LOmean = 920.0

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 2421. 2.082

Hut 1.5.5 TDC counts

Events

0 100 200

2400 2450 2500

Entries Mean RMS 800 2421. 2.082

Hut 1.5.5

Hut 1.5.5 TDC counts

Events

HImean = 932.5 LOmean = 767.9

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2474. 2.687

Hut 1.5.6 TDC counts

Events

0

100

2450 2500 2550

Entries Mean RMS 800 2474. 2.687

Hut 1.5.6

Hut 1.5.6 TDC counts

Events

HImean = 1125.7 LOmean = 805.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2442. 2.553

Hut 1.5.7 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2442. 2.553

Hut 1.5.7

Hut 1.5.7 TDC counts

Events

HImean = 721.9 LOmean = 1020.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2551. 2.183

Hut 1.5.8 TDC counts

Events

0

100

2500 2550 2600 2650

Entries Mean RMS 800 2551. 2.183

Hut 1.5.8

Hut 1.5.8 TDC counts

Events

HImean = 960.6 LOmean = 711.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2506. 2.779

Hut 1.6.2 TDC counts

Events

0

100

2500 2550 2600

Entries Mean RMS 800 2506. 2.779

Hut 1.6.2

Hut 1.6.2 TDC counts

Events

HImean = 993.3 LOmean = 867.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2558. 2.324

Hut 1.6.3 TDC counts

Events

0

100

2550 2600 2650

Entries Mean RMS 800 2558. 2.324

Hut 1.6.3

Hut 1.6.3 TDC counts

Events

HImean = 982.3 LOmean = 769.4

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2520. 2.169

Hut 1.6.4 TDC counts

Events

0

100

2500 2550 2600

Entries Mean RMS 800 2520. 2.169

Hut 1.6.4

Hut 1.6.4 TDC counts

Events

HImean = 1146.5 LOmean = 936.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2480. 2.166

Hut 1.6.5 TDC counts

Events

0

100

2450 2500 2550

Entries Mean RMS 800 2480. 2.166

Hut 1.6.5

Hut 1.6.5 TDC counts

Events

HImean = 1312.3 LOmean = 922.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2616. 2.270

Hut 1.6.6 TDC counts

Events

0

100

2600 2650 2700

Entries Mean RMS 800 2616. 2.270

Hut 1.6.6

Hut 1.6.6 TDC counts

Events

HImean = 1143.7 LOmean = 810.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2543. 2.149

Hut 1.6.7 TDC counts

Events

0

100

2500 2550 2600

Entries Mean RMS 800 2543. 2.149

Hut 1.6.7

Hut 1.6.7 TDC counts

Events

HImean = 1304.4 LOmean = 809.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2369. 2.407

Hut 1.6.8 TDC counts

Events

0

100

200

2350 2400 2450

Entries Mean RMS 800 2369. 2.407

Hut 1.6.8

Hut 1.6.8 TDC counts

Events

HImean = 1203.4 LOmean = 839.1

LP calibrations Calib 8596.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2322. 2.498

Hut 1.7.2 TDC counts

Events

0

100

200

2300 2350 2400

Entries Mean RMS 800 2322. 2.498

Hut 1.7.2

Hut 1.7.2 TDC counts

Events

HImean = 924.4 LOmean = 631.5

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2360. 167.3

Hut 1.7.3 TDC counts

Events

0

50

100

2350 2400 2450

Entries Mean RMS 800 2360. 167.3

Hut 1.7.3

Hut 1.7.3 TDC counts

Events

HImean = 483.8 LOmean = 445.0

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2322. 2.733

Hut 1.7.4 TDC counts

Events

0 50 100

2300 2350 2400

Entries Mean RMS 800 2322. 2.733

Hut 1.7.4

Hut 1.7.4 TDC counts

Events

HImean = 866.8 LOmean = 715.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2330. 1.890

Hut 1.7.5 TDC counts

Events

0

100

2300 2350 2400

Entries Mean RMS 800 2330. 1.890

Hut 1.7.5

Hut 1.7.5 TDC counts

Events

HImean = 1094.3 LOmean = 862.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2276. 2.564

Hut 1.7.6 TDC counts

Events

0

100

2250 2300 2350

Entries Mean RMS 800 2276. 2.564

Hut 1.7.6

Hut 1.7.6 TDC counts

Events

HImean = 1223.8 LOmean = 746.0

LP calibrations Calib 8596.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2318. 2.099

Hut 1.7.7 TDC counts

Events

0

100

200

2300 2350 2400

Entries Mean RMS 800 2318. 2.099

Hut 1.7.7

Hut 1.7.7 TDC counts

Events

HImean = 1137.1 LOmean = 1461.3

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2426. 2.708

Hut 1.7.8 TDC counts

Events

0 50 100

2400 2450 2500

Entries Mean RMS 800 2426. 2.708

Hut 1.7.8

Hut 1.7.8 TDC counts

Events

HImean = 1229.3 LOmean = 1224.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2408. 2.485

Hut 1.8.2 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2408. 2.485

Hut 1.8.2

Hut 1.8.2 TDC counts

Events

HImean = 1064.6 LOmean = 684.9

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 2440. 1.814

Hut 1.8.3 TDC counts

Events

0 100 200

2400 2450 2500

Entries Mean RMS 800 2440. 1.814

Hut 1.8.3

Hut 1.8.3 TDC counts

Events

HImean = 841.6 LOmean = 551.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2316. 2.121

Hut 1.8.4 TDC counts

Events

0

100

2300 2350 2400

Entries Mean RMS 800 2316. 2.121

Hut 1.8.4

Hut 1.8.4 TDC counts

Events

HImean = 1292.4 LOmean = 763.8

LP calibrations Calib 8596.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2395. 2.007

Hut 1.8.5 TDC counts

Events

0

100

200

2350 2400 2450

Entries Mean RMS 800 2395. 2.007

Hut 1.8.5

Hut 1.8.5 TDC counts

Events

HImean = 1026.7 LOmean = 771.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2321. 2.197

Hut 1.8.6 TDC counts

Events

0

100

2300 2350 2400

Entries Mean RMS 800 2321. 2.197

Hut 1.8.6

Hut 1.8.6 TDC counts

Events

HImean = 1511.4 LOmean = 1085.7

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2441. 2.729

Hut 1.8.7 TDC counts

Events

0 50 100

2400 2450 2500

Entries Mean RMS 800 2441. 2.729

Hut 1.8.7

Hut 1.8.7 TDC counts

Events

HImean = 1066.3 LOmean = 702.8

0 50 100 150

0 1000 2000 3000 4000

Entries Mean RMS 800 2387. 84.48

Hut 1.8.8 TDC counts

Events

0 50 100 150

2350 2400 2450

Entries Mean RMS 800 2387. 84.48

Hut 1.8.8

Hut 1.8.8 TDC counts

Events

HImean = 1129.2 LOmean = 710.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2388. 2.524

Hut 1.9.2 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2388. 2.524

Hut 1.9.2

Hut 1.9.2 TDC counts

Events

HImean = 914.9 LOmean = 561.0

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2359. 2.613

Hut 1.9.3 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2359. 2.613

Hut 1.9.3

Hut 1.9.3 TDC counts

Events

HImean = 1085.8 LOmean = 739.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2454. 2.277

Hut 1.9.4 TDC counts

Events

0

100

2450 2500 2550

Entries Mean RMS 800 2454. 2.277

Hut 1.9.4

Hut 1.9.4 TDC counts

Events

HImean = 896.2 LOmean = 558.7

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 2388. 2.266

Hut 1.9.5 TDC counts

Events

0 100 200

2350 2400 2450

Entries Mean RMS 800 2388. 2.266

Hut 1.9.5

Hut 1.9.5 TDC counts

Events

HImean = 1447.1 LOmean = 1183.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2425. 2.157

Hut 1.9.6 TDC counts

Events

0

100

200

2400 2450 2500

Entries Mean RMS 800 2425. 2.157

Hut 1.9.6

Hut 1.9.6 TDC counts

Events

HImean = 1207.4 LOmean = 849.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2386. 1.852

Hut 1.9.7 TDC counts

Events

0

100

200

2350 2400 2450

Entries Mean RMS 800 2386. 1.852

Hut 1.9.7

Hut 1.9.7 TDC counts

Events

HImean = 1059.1 LOmean = 789.9

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2263. 2.193

Hut 1.9.8 TDC counts

Events

0

100

2250 2300 2350

Entries Mean RMS 800 2263. 2.193

Hut 1.9.8

Hut 1.9.8 TDC counts

Events

HImean = 1049.8 LOmean = 767.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2636. 2.420

Hut 1.10.2 TDC counts

Events

0

100

2600 2650 2700

Entries Mean RMS 800 2636. 2.420

Hut 1.10.2

Hut 1.10.2 TDC counts

Events

HImean = 921.4 LOmean = 1181.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2444. 2.057

Hut 1.10.3 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2444. 2.057

Hut 1.10.3

Hut 1.10.3 TDC counts

Events

HImean = 1324.5 LOmean = 864.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2389. 2.433

Hut 1.10.4 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2389. 2.433

Hut 1.10.4

Hut 1.10.4 TDC counts

Events

HImean = 1070.4 LOmean = 862.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2403. 1.977

Hut 1.10.5 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2403. 1.977

Hut 1.10.5

Hut 1.10.5 TDC counts

Events

HImean = 1265.4 LOmean = 859.8

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2398. 2.333

Hut 1.10.6 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2398. 2.333

Hut 1.10.6

Hut 1.10.6 TDC counts

Events

HImean = 1345.0 LOmean = 1079.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2433. 2.521

Hut 1.10.7 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2433. 2.521

Hut 1.10.7

Hut 1.10.7 TDC counts

Events

HImean = 1306.7 LOmean = 821.6

0

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2446. 2.131

Hut 1.10.8 TDC counts

Events

0

200

2400 2450 2500

Entries Mean RMS 800 2446. 2.131

Hut 1.10.8

Hut 1.10.8 TDC counts

Events

HImean = 989.5 LOmean = 835.9

0 20 40

0 1000 2000 3000 4000

Entries Mean RMS 800 2094. 29.59

Hut 1.11.3 TDC counts

Events

0 20 40

2050 2100 2150

Entries Mean RMS 800 2094. 29.59

Hut 1.11.3

Hut 1.11.3 TDC counts

Events

HImean = 1005.4 LOmean = 979.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2645. 2.667

Hut 1.11.4 TDC counts

Events

0

100

2600 2650 2700

Entries Mean RMS 800 2645. 2.667

Hut 1.11.4

Hut 1.11.4 TDC counts

Events

HImean = 1150.2 LOmean = 846.7

LP calibrations Calib 8596.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2613. 2.287

Hut 1.11.5 TDC counts

Events

0

100

2600 2650 2700

Entries Mean RMS 800 2613. 2.287

Hut 1.11.5

Hut 1.11.5 TDC counts

Events

HImean = 1080.9 LOmean = 745.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2261. 2.387

Hut 1.11.6 TDC counts

Events

0

100

2250 2300 2350

Entries Mean RMS 800 2261. 2.387

Hut 1.11.6

Hut 1.11.6 TDC counts

Events

HImean = 902.9 LOmean = 772.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2506. 2.174

Hut 1.11.7 TDC counts

Events

0

100

2500 2550 2600

Entries Mean RMS 800 2506. 2.174

Hut 1.11.7

Hut 1.11.7 TDC counts

Events

HImean = 1148.6 LOmean = 1030.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2356. 2.429

Hut 1.11.8 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2356. 2.429

Hut 1.11.8

Hut 1.11.8 TDC counts

Events

HImean = 1327.8 LOmean = 1077.3

TDC calibrations Calib 8596.1

0 2000

4000

10 20 30

39.05 / 12 P1 -1370. P2 168.2

icalid

(TDC counts)

Hut 1.4.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.3

Hut 1.4.3 icalid

Δfit (TDC counts)

0.148619 ns/TDCcount

0

2000

4000

10 20 30

10.16 / 13 P1 -1575. P2 167.6

icalid

(TDC counts)

Hut 1.4.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.4

Hut 1.4.4 icalid

Δfit (TDC counts)

0.149155 ns/TDCcount

0

2000

4000

10 20 30

11.54 / 13 P1 -1589. P2 167.7

icalid

(TDC counts)

Hut 1.4.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.5

Hut 1.4.5 icalid

Δfit (TDC counts)

0.14908 ns/TDCcount

0

2000

4000

10 20 30

19.75 / 13 P1 -1574. P2 167.9

icalid

(TDC counts)

Hut 1.4.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.6

Hut 1.4.6 icalid

Δfit (TDC counts)

0.148919 ns/TDCcount

0

2000

4000

10 20 30

7.771 / 13 P1 -1551. P2 167.6

icalid

(TDC counts)

Hut 1.4.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.7

Hut 1.4.7 icalid

Δfit (TDC counts)

0.14919 ns/TDCcount

TDC calibrations Calib 8596.1

0 2000

4000

10 20 30

56.14 / 13 P1 -1407. P2 168.3

icalid

(TDC counts)

Hut 1.4.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.8

Hut 1.4.8 icalid

Δfit (TDC counts)

0.148507 ns/TDCcount

0 2000

4000

10 20 30

34.42 / 13 P1 -1413. P2 168.2

icalid

(TDC counts)

Hut 1.5.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.2

Hut 1.5.2 icalid

Δfit (TDC counts)

0.148595 ns/TDCcount

0

2000

4000

10 20 30

17.59 / 13 P1 -1542. P2 167.6

icalid

(TDC counts)

Hut 1.5.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.3

Hut 1.5.3 icalid

Δfit (TDC counts)

0.149121 ns/TDCcount

0

2000

4000

10 20 30

9.600 / 13 P1 -1575. P2 167.8

icalid

(TDC counts)

Hut 1.5.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.4

Hut 1.5.4 icalid

Δfit (TDC counts)

0.148987 ns/TDCcount

0

2000

4000

10 20 30

9.557 / 13 P1 -1565. P2 167.7

icalid

(TDC counts)

Hut 1.5.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.5

Hut 1.5.5 icalid

Δfit (TDC counts)

0.149039 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

10.11 / 13 P1 -1584. P2 167.7

icalid

(TDC counts)

Hut 1.5.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.6

Hut 1.5.6 icalid

Δfit (TDC counts)

0.149048 ns/TDCcount

0

2000

4000

10 20 30

13.30 / 13 P1 -1576. P2 167.9

icalid

(TDC counts)

Hut 1.5.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.7

Hut 1.5.7 icalid

Δfit (TDC counts)

0.148904 ns/TDCcount

0

2000

4000

10 20 30

17.53 / 13 P1 -1559. P2 167.8

icalid

(TDC counts)

Hut 1.5.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.8

Hut 1.5.8 icalid

Δfit (TDC counts)

0.148959 ns/TDCcount

0

2000

4000

10 20 30

33.24 / 13 P1 -1589. P2 168.0

icalid

(TDC counts)

Hut 1.6.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.2

Hut 1.6.2 icalid

Δfit (TDC counts)

0.148784 ns/TDCcount

0

2000

4000

10 20 30

28.07 / 13 P1 -1597. P2 168.0

icalid

(TDC counts)

Hut 1.6.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.3

Hut 1.6.3 icalid

Δfit (TDC counts)

0.148781 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

79.73 / 13 P1 -1608. P2 168.3

icalid

(TDC counts)

Hut 1.6.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.4

Hut 1.6.4 icalid

Δfit (TDC counts)

0.148565 ns/TDCcount

0

2000

4000

10 20 30

11.79 / 13 P1 -1558. P2 167.8

icalid

(TDC counts)

Hut 1.6.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.5

Hut 1.6.5 icalid

Δfit (TDC counts)

0.148979 ns/TDCcount

0

2000

4000

10 20 30

8.437 / 13 P1 -1598. P2 167.7

icalid

(TDC counts)

Hut 1.6.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.6

Hut 1.6.6 icalid

Δfit (TDC counts)

0.149041 ns/TDCcount

0

2000

4000

10 20 30

11.94 / 13 P1 -1618. P2 167.9

icalid

(TDC counts)

Hut 1.6.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.7

Hut 1.6.7 icalid

Δfit (TDC counts)

0.148922 ns/TDCcount

0

2000

4000

10 20 30

7.794 / 13 P1 -1578. P2 167.6

icalid

(TDC counts)

Hut 1.6.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.8

Hut 1.6.8 icalid

Δfit (TDC counts)

0.149153 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

17.54 / 13 P1 -1569. P2 167.9

icalid

(TDC counts)

Hut 1.7.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.2

Hut 1.7.2 icalid

Δfit (TDC counts)

0.148903 ns/TDCcount

0

2000

4000

10 20 30

33.27 / 13 P1 -1592. P2 168.1

icalid

(TDC counts)

Hut 1.7.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.3

Hut 1.7.3 icalid

Δfit (TDC counts)

0.148713 ns/TDCcount

0

2000

4000

10 20 30

35.28 / 13 P1 -1617. P2 168.1

icalid

(TDC counts)

Hut 1.7.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.4

Hut 1.7.4 icalid

Δfit (TDC counts)

0.148701 ns/TDCcount

0

2000

4000

10 20 30

12.67 / 13 P1 -1611. P2 167.8

icalid

(TDC counts)

Hut 1.7.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.5

Hut 1.7.5 icalid

Δfit (TDC counts)

0.149006 ns/TDCcount

0

2000

4000

10 20 30

6.916 / 13 P1 -1617. P2 167.6

icalid

(TDC counts)

Hut 1.7.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.6

Hut 1.7.6 icalid

Δfit (TDC counts)

0.149163 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

14.37 / 13 P1 -1619. P2 168.2

icalid

(TDC counts)

Hut 1.7.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.7

Hut 1.7.7 icalid

Δfit (TDC counts)

0.148641 ns/TDCcount

0

2000

4000

10 20 30

63.74 / 13 P1 -1581. P2 168.3

icalid

(TDC counts)

Hut 1.7.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.8

Hut 1.7.8 icalid

Δfit (TDC counts)

0.148573 ns/TDCcount

0

2000

4000

10 20 30

34.43 / 13 P1 -1595. P2 168.1

icalid

(TDC counts)

Hut 1.8.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.2

Hut 1.8.2 icalid

Δfit (TDC counts)

0.148751 ns/TDCcount

0

2000

4000

10 20 30

29.76 / 13 P1 -1566. P2 167.9

icalid

(TDC counts)

Hut 1.8.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.3

Hut 1.8.3 icalid

Δfit (TDC counts)

0.148884 ns/TDCcount

0

2000

4000

10 20 30

10.14 / 13 P1 -1603. P2 168.5

icalid

(TDC counts)

Hut 1.8.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.4

Hut 1.8.4 icalid

Δfit (TDC counts)

0.148369 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

33.03 / 13 P1 -1536. P2 166.8

icalid

(TDC counts)

Hut 1.8.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.5

Hut 1.8.5 icalid

Δfit (TDC counts)

0.149844 ns/TDCcount

0

2000

4000

10 20 30

11.80 / 13 P1 -1553. P2 167.7

icalid

(TDC counts)

Hut 1.8.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.6

Hut 1.8.6 icalid

Δfit (TDC counts)

0.149112 ns/TDCcount

0

2000

4000

10 20 30

9.851 / 13 P1 -1563. P2 167.7

icalid

(TDC counts)

Hut 1.8.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.7

Hut 1.8.7 icalid

Δfit (TDC counts)

0.14911 ns/TDCcount

0

2000

4000

10 20 30

9.180 / 13 P1 -1598. P2 167.7

icalid

(TDC counts)

Hut 1.8.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.8

Hut 1.8.8 icalid

Δfit (TDC counts)

0.149079 ns/TDCcount

0

2000

4000

10 20 30

12.40 / 13 P1 -1616. P2 167.7

icalid

(TDC counts)

Hut 1.9.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.2

Hut 1.9.2 icalid

Δfit (TDC counts)

0.149054 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

7.590 / 13 P1 -1610. P2 167.6

icalid

(TDC counts)

Hut 1.9.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.3

Hut 1.9.3 icalid

Δfit (TDC counts)

0.1492 ns/TDCcount

0

2000

4000

10 20 30

9.502 / 13 P1 -1556. P2 167.7

icalid

(TDC counts)

Hut 1.9.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.4

Hut 1.9.4 icalid

Δfit (TDC counts)

0.149054 ns/TDCcount

0

2000

4000

10 20 30

15.23 / 13 P1 -1563. P2 167.7

icalid

(TDC counts)

Hut 1.9.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.5

Hut 1.9.5 icalid

Δfit (TDC counts)

0.149036 ns/TDCcount

0

2000

4000

10 20 30

13.08 / 13 P1 -1575. P2 167.7

icalid

(TDC counts)

Hut 1.9.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.6

Hut 1.9.6 icalid

Δfit (TDC counts)

0.149035 ns/TDCcount

0

2000

4000

10 20 30

8.161 / 13 P1 -1594. P2 167.5

icalid

(TDC counts)

Hut 1.9.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.7

Hut 1.9.7 icalid

Δfit (TDC counts)

0.149223 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

6.145 / 13 P1 -1563. P2 167.7

icalid

(TDC counts)

Hut 1.9.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.8

Hut 1.9.8 icalid

Δfit (TDC counts)

0.149035 ns/TDCcount

0

2000

4000

10 20 30

42.94 / 13 P1 -1469. P2 167.8

icalid

(TDC counts)

Hut 1.10.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.2

Hut 1.10.2 icalid

Δfit (TDC counts)

0.14896 ns/TDCcount

0

2000

4000

10 20 30

6.446 / 13 P1 -1558. P2 167.6

icalid

(TDC counts)

Hut 1.10.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.3

Hut 1.10.3 icalid

Δfit (TDC counts)

0.149136 ns/TDCcount

0

2000

4000

10 20 30

10.03 / 13 P1 -1589. P2 167.7

icalid

(TDC counts)

Hut 1.10.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.4

Hut 1.10.4 icalid

Δfit (TDC counts)

0.149078 ns/TDCcount

0

2000

4000

10 20 30

19.62 / 13 P1 -1575. P2 167.3

icalid

(TDC counts)

Hut 1.10.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.5

Hut 1.10.5 icalid

Δfit (TDC counts)

0.149446 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

11.21 / 13 P1 -1568. P2 167.7

icalid

(TDC counts)

Hut 1.10.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.6

Hut 1.10.6 icalid

Δfit (TDC counts)

0.149054 ns/TDCcount

0

2000

4000

10 20 30

10.79 / 13 P1 -1534. P2 167.7

icalid

(TDC counts)

Hut 1.10.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.7

Hut 1.10.7 icalid

Δfit (TDC counts)

0.149077 ns/TDCcount

0

2000

4000

10 20 30

40.40 / 12 P1 -1543. P2 168.3

icalid

(TDC counts)

Hut 1.10.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.8

Hut 1.10.8 icalid

Δfit (TDC counts)

0.148576 ns/TDCcount

0

2000

4000

10 20 30

97.41 / 13 P1 -1509. P2 168.3

icalid

(TDC counts)

Hut 1.11.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.3

Hut 1.11.3 icalid

Δfit (TDC counts)

0.148562 ns/TDCcount

0

2000

4000

10 20 30

28.01 / 12 P1 -1519. P2 168.1

icalid

(TDC counts)

Hut 1.11.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.4

Hut 1.11.4 icalid

Δfit (TDC counts)

0.148764 ns/TDCcount

TDC calibrations Calib 8596.1

0

2000

4000

10 20 30

21.18 / 12 P1 -1511. P2 167.7

icalid

(TDC counts)

Hut 1.11.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.5

Hut 1.11.5 icalid

Δfit (TDC counts)

0.149113 ns/TDCcount

0

2000

4000

10 20 30

22.11 / 13 P1 -1635. P2 167.9

icalid

(TDC counts)

Hut 1.11.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.6

Hut 1.11.6 icalid

Δfit (TDC counts)

0.148856 ns/TDCcount

0

2000

4000

10 20 30

25.30 / 13 P1 -1613. P2 168.0

icalid

(TDC counts)

Hut 1.11.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.7

Hut 1.11.7 icalid

Δfit (TDC counts)

0.148841 ns/TDCcount

0

2000

10 20 30

0.6388E+07/ 15 P1 1272. P2 48.71

icalid

(TDC counts)

Hut 1.11.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.8

Hut 1.11.8 icalid

Δfit (TDC counts)

0.513288 ns/TDCcount